(BeO, PG, ...)

(Bridged-)Hybrid

Cooling pipe

(BeO only, PG-backed,...)

"End-tapping" to "Center-tapping"

Detector (Stereo)

Detector

Bridged-Hybrid

Support &

Cooling pipes

Expanded View "A"

(BeO, PG, ...)

(Bridged-)Hybrid

Cooling pipe

(BeO only, PG-backed,...)

A(Note: NOT SCALED WELL!!)

Concept of "Center-tapped" & "No-gluing"

(Two cooling pipe scheme)

Detector (Stereo)

Detector

Bridged-Hybrid

Support &

Cooling pipes

(BeO, PG, ...)

Cooling pipe

(PG-backed(thick),...)

AExpanded View "A"

(Note: NOT SCALED WELL!!)

Concept of "Center-tapped" & "No-gluing"

(One cooling pipe scheme)