77 REF.

N-side

85.139.4

134.6

144.8

1656.46.4

22.1

5.1 BeO bridge

Kapton hybrid

177.8

161.8

70

N-side

85.1

134.6

144.8

82.1

5.1

Kapton hybrid

39.4

6.4177.8

221.830.6

6.416570

111.1

3030

32.3106.3

3030

32.3