N-side

Kapton hybrid

N-side

N-side

310139

118.09

310139

118.09

245

294.5Blue boxSall box

179Blue boxSmall box

Front viewFront view without the front coverBeamtest9706/H8May 7,1997KEK T.KohrikiScale 1/4 66

56.5

56.5

49.5661.5

7

7