N-side

Kapton hybrid

N-side

N-side

BeO bridge

Kapton hybrid

61.59

End-tap moduleCentre-tap moduleSmall boxBeamtest9706/H8Assembly of the small box with modulesScale 1/2.5May 7,1997KEK T.Kohriki

24517917954665154

49.5

20

54Cables

294.5 A

BAB