Tuesday, February 13 6:44 AM 1996

Page #1 - �KEK_96_nbcx.y_Files�

LBIC2

UCSC1

ATT2

UCSC2

ATT4

Threshold [fC]

[ mV ](fC)

[ mV ]

[ fC ]

173890.802170 (0.96)

170 (0.95)

95202991.0032301081.2042571171.4052951311.7063291442.0074161883.0084732304.009