Tuesday, February 13 6:55 AM 1996

Page #1 - �KEK_96_rcx.y_Files�

LBIC2

UCSC1

ATT2

UCSC2

ATT4 rcx.y

[ fC ]

[ mV ]

10.090

500.210

500.190

320.030

50320.200

20.190

650.300

410.120

65410.300

30.300

800.390

800.400

490.220

80490.400

40.410

950.480

950.500

570.310

950.120

570.500

50.500

1080.560

1080.590

640.390

1080.270

640.600

60.630

1250.670

1250.700

720.490

1250.440

720.700

70.770

1450.800

1450.810

800.620

1450.610

800.800

80.960170

0.970

1701.000

950.780

1700.920

950.900 9