Fig. 3. Spot positions of the laser light on the SDC prototype silicon strip detectorand the induced signals at the n-side on the oscilloscope. The spot size was 3 mm by 3 mm.The inset figures show the readout strips and the spot. The strip pitch was 50 mm andthe left-hand side strip was the readout. Spot from the readout at, (a) 0 mm, (b) 5 mm, (c) 10 mm, (d) 20 mm, (e) 35 mm, and (f) 60 mm.

(a) 0 mm

(b) 5 mm

(c) 10 mm

(d) 20 mm

(e) 35 mm

(f) 60 mm