ATLAS SCT Module Test - Thu Apr 24 18:16:29 2003 - KEK - Module 20220170200400mDaqIN Run 5238 Scan 16 Module 1 Link 0 - THRESHOLD (mV) from 0.00mV to 200.00mV in 2.50mV steps, total 81 points

Chip 0 Chip 1 Chip 2 Chip 3 Chip 4 Chip 5

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal0 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal0 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal0 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal0 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal0 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal0 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal1 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal1 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal1 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal1 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal1 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal1 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal2 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal2 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal2 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal2 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal2 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal2 Nent = 0

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal3_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal3_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal3_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal3_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal3_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80100120140160180200 0 2000

4000

6000

8000

10000

scurves cal3_{Nent = 0}

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0