ATLAS SCT Noise Occupancy S-Curves - Fri Sep 24 20:39:44 2004 - UNKNOWN Page 1 Run 6713 Scan 54 Module 5 (20220170200967mDaqLTL) - Type . T0 -1.0C

M0 S1 S2 S3 S4 E5

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal0 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal0 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal0 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal0 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal0 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal0 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal1 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal1 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal1 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal1 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal1 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal1 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal2 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal2 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal2 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal2 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal2 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal2 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal3 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal3 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal3 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal3 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal3 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal3 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

ATLAS SCT Noise Occupancy S-Curves - Fri Sep 24 20:39:44 2004 - UNKNOWN Page 2 Run 6713 Scan 54 Module 5 (20220170200967mDaqLTL) - Type . T0 -1.0C

M8 S9 S10 S11 S12 E13

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal0 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal0 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal0 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal0 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal0 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal0 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal1 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal1 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal1 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal1 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal1 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal1 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal2 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal2 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal2 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal2 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal2 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal2 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal3 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal3 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal3 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal3 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal3 Nent = 0

THRESHOLD (mV)

-60 -40 -20 0 20 40 60 0 0.2 0.4 0.6 0.8 1 scurves cal3 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0

0

1 Nent = 0