01 0 0 2 0 0 3 0 0 4 0 0 5 0 0 02 0 4 0 6 0 8 0 1 0 0 1 2 0 1 4 0 1 6 0 n-Mean [mV] p-Mean [mV] n-Mean [mV]Bias voltage [V]y=1.0cm n-Mean [mV]Bias voltage [V]y=2.0cm n-Mean [mV]Bias voltage [V]y=3.0cm n-Mean [mV]Bias voltage [V]y=4.2cm