0 100 200 300 400 500 600 700 0 100 200 300 400 500 600

Threshold Dac

No Irrad. 2.5 Mrad 5.0 Mrad 10.0 Mrad

Value set (mV) mV

0

0 50 100 150 200 250 300 0 50 100 150 200 250 300

Ipre DAC

No Irrad. 2.5 Mrad 5.0 Mrad 10.0 Mrad

Value set (μA) μA

0

0 5 10 15 20 25 30 35 40 0 5 10 15 20 25

30

Ishap DAC

No Irrad. 2.5 Mrad 5.0 Mrad 10.0 Mrad

Value set (μA) μA

0 5