noises18b175t200x20.dat2

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch640-ch671

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch672-ch703

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch704-ch735

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch736-ch767

noises18b184t200x20.dat2

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch640-ch671

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch672-ch703

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch704-ch735

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch736-ch767

noises18b193t200x20.dat2

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch640-ch671

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch672-ch703

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch704-ch735

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch736-ch767

noises18b202t200x20.dat2

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch640-ch671

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch672-ch703

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch704-ch735

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch736-ch767

noises18b212t200x20.dat2

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch640-ch671

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch672-ch703

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch704-ch735

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch736-ch767

noises18b221t200x20.dat2

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch640-ch671

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch672-ch703

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch704-ch735

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch736-ch767

noises18b230t200x20.dat2

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch640-ch671

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch672-ch703

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch704-ch735

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch736-ch767

noises18b239t200x20.dat2

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch640-ch671

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch672-ch703

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch704-ch735

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch736-ch767

noises18b248t200x20.dat2

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch640-ch671

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch672-ch703

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch704-ch735

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch736-ch767

noises18b258t200x20.dat2

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch640-ch671

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch672-ch703

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch704-ch735

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch736-ch767

noises18b267t200x20.dat2

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch640-ch671

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch672-ch703

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch704-ch735

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch736-ch767

noises18b276t200x20.dat2

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch640-ch671

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch672-ch703

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch704-ch735

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch736-ch767

noises18b285t200x20.dat2

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch640-ch671

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch672-ch703

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch704-ch735

0 0.2 0.4 0.6 0.8 1 1.2

0 50 100 150 200

Threshold

Efficiency ch736-ch767