TPGBeO TPG Horizontal face7

39.5

45.54.560

380250

TDRModApr97

4227

76Open space for cooling contact 0

12

34

48

60

880913207885

0

6

28

42

BeO03853TPGTPG

BeOBeO baseboardBeO facing stiffner-farendTPG left-sideTPG right-sideBeO facing stiffner-nearend

Composite baseboard parts list

0

12

34

48

600913207885

0

6

28

42053

0

4003853

0

12

40085

0

22013

0

60(0.166 %Xo normalized to 128 x 63.6 mm^2) 07

0

42380250TDRModApr97

013207885